REPLACE INTO `d3_cfg_mod` (`OXID`, `OXSHOPID`, `OXMODID`, `OXNAME`, `OXACTIVE`, `OXSERIAL`, `OXINSTALLDATE`, `OXVERSION`, `OXSHOPVERSION`, `OXISMODULELOG`, `OXREQUIREMENTS`, `OXVALUE`, `OXVALUE_1`, `OXVALUE_2`, `OXREVISION`, `OXNEWREVISION`) VALUES
('504bcce44c2539d8905980e80630ddf5', 'oxbaseshop', 'd3_googleanalytics', 'Google Analytics', 1, '', NOW(), '2.1.0', 'PE4 / CE4', 0, '', '', '', '', 9, 9);