CREATE TABLE `d3totp` (
	`OXID` CHAR(32) NOT NULL,
	`OXUSERID` CHAR(32) NOT NULL,
	`USETOTP` TINYINT(1) NOT NULL DEFAULT '0',
	`SEED` VARCHAR(125) NOT NULL DEFAULT '0',
	PRIMARY KEY (`OXID`),
	UNIQUE INDEX `OXUSERID` (`OXUSERID`)
)
ENGINE=InnoDB